Interball Auroral Probe / PROMICS-3 19970111

UT MLT CGLAT ALT

D11 H+

   67
   37
   19
  9.5
  5.0

D10 H+

   28
 14.3
  6.4
  2.7
  1.1

D 5 H+

  1.5
 0.29
0.049
0.008
0.004

D 8 H+

   28
 14.3
  6.4
  2.7
  1.1

D 3 H+

  1.5
 0.29
0.049
0.008
0.004

D 6 H+

   28
 14.3
  6.4
  2.7
  1.1

D 1 H+

  1.5
 0.29
0.049
0.008
0.004

D15

   35
  6.1
  1.0
 0.25
0.012 cts 1E+03

1E+00 cts 1E+03

1E+00 cts 1E+03

4E+01 cts 1E+03

1E+00 cts 1E+03

1E+01 cts 1E+03

1E+00 cts 1E+03

1E+00 cts 1E+04

1E+01

    04.00
    15.58
    65.74
    11169

                       04.30
                       16.99
                       74.38
                       15053

                                           05.00
                                           18.78
                                           77.95
                                           17589

                                                              05.30
                                                              20.64
                                                              78.28
                                                              18921

                                                                                  06.00
                                                                                  22.14
                                                                                  76.46
                                                                                  19124